MAT SOLVE

CELL

WATER

MCNF

0 20 40 60 80

Percentage reduction in checkpoint size

0

MAT SOLVE

CELL

WATER

MCNF

-20 0 20 40 60 80 100

Percentage reduction in checkpoint overhead

0