Plank & Li: SHPCC ’94: Performance results of ickp 11

3 Consistent Ckpt Algorithms

- #3: NETWORK SWEEPING (NS): Good: No system freezing Bad: Allows a message state Good: O(n log n) markers

Node 0 Node 1 Node 2 Node 3